
             ┌─────────────────────────────────────────────────┐       
      ┌──────┤ CONSTRUCTION BBS Sysops Only - "6" COMMAND HELP ├──────┐
      │      └─────────────────────────────────────────────────┘      │
      │     A "5" command simply displays the current contents        │
      │     of the SCHED.BBS file, Fido's scheduler.                  │
      │                                                               │
      │     A "6" command actually sets the scheduler events.         │
      │     The prompts that follow are:                              │
      │                                                               │
      │     Event #  (1-32)           Day of Week (All or Mon, ie)    │
      │     Time  (24hr)              Window (duration in minutes)    │
      │     Tag (for routing)         ErrorLevel if Tag is X          │
      │                                                               │
      │     A "7" command enables/disables/removes existing events    │
      │                                                               │
      │     The scheduler is dependent on the system time and date    │
      │     and consequently these should be set accurately.  It      │
      │     is strongly recommend that a clock/calendar w/ battery    │
      │     backup power be a part of your system hardware.           │
      └───────────────────────────────────────────────────────────────┘
      